D0properTime

Entries 18953 Mean 0.03127 RMS 0.188 Underflow 0.005386 Overflow 0.005386 / ndf

2χ 1.3e+02 / 2 Prob 8.2e-30 Constant 0.00±

0.37 Mean 0.001 ± 0.016 Sigma 0.0± 0.1

properTime [ps] 0D -1 -0.5 0 0.5 1 1.5 2 2.5 3 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

±

: proper time 0D