D0properTime

Entries 18953

Mean 0.06999

RMS 0.03985

Underflow 0

Overflow 162

proper time resolution [ps] 0D -0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3 0.4 0

1000

2000

3000

4000

5000

6000

7000

: proper time resolution 0D