MC: D0properTime

Entries 4977

Mean 0.6111

RMS 0.4561

Underflow 1

Overflow 271

properTime [ps] 0 MC: D

-1 -0.5 0 0.5 1 1.5 2 2.5 3 0

100

200

300

400

500

: proper time 0 MC: D