MC: D0properTime

Entries 4977 Mean 0.0137 RMS 0.06809 Underflow 261 Overflow 159 / ndf

2χ 58 / 5 Prob 3.1e-11 Constant 1.7e+01 ± 7.5e+02 Mean 0.0008 ± 0.0063 Sigma 0.001±

0.043

proper time resolution [ps] 0 MC: D

-0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3 0.4 0

200

400

600

800

1000

± ±

: proper time resolution 0 MC: D