D0properTime

Entries 1590 Mean 0.00359 RMS 0.1371 Underflow 0.01022 Overflow 0.005751 / ndf

2χ 36 / 3 Prob 6e-08 Constant 0.0± 0.5 Mean 0.00195 ± -0.00093 Sigma 0.002±

0.075

properTime [ps] 0D -1 -0.5 0 0.5 1 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

±

: proper time 0D