D0properTime

Entries 1590

Mean 0.007652

RMS 1.218

Underflow 31

Overflow 45

proper time pull 0D -4 -3 -2 -1 0 1 2 3 4 0

10

20

30

40

50

60

70

: proper time pull 0D